<template>
  <div class="ndr-upload1">
    123456
  </div>
</template>

<script>
export default {
  name: 'test',
  props: {

  },
  data () {
    return {
      test: 123
    }
  },
  created () {

  },
  mounted () {

  },
  methods: {

  }
}
</script>

<!-- Add "scoped" attribute to limit CSS to this component only -->
<style lang="scss" rel="stylesheet/scss">
.ndr-upload1 {
  font-size: 20px;
  color: red;
}
</style>
